en-us	You will be redirected to the login page in a few seconds.

en-us	Please, check your mailbox.

en-us	A link to reset your password has been sent to you.

en-us	For security reasons, you cannot connect to the back office until you have:

en-us	deleted the /install folder

en-us	renamed the /admin folder (e.g. %s)

en-us	Please then access this page by the new URL (e.g. %s)

en-us	For security reasons, you must also delete the /install folder.

en-us	SSL is activated. However, your IP is allowed to enter unsecure mode for maintenance or local IP issues.

en-us	SSL is activated. Please connect using the following link to [1]log in to secure mode (https://)[/1]

en-us	The employee does not exist, or the password provided is incorrect.

en-us	This employee does not manage the shop anymore (either the shop has been deleted or permissions have been revoked).

en-us	This account does not exist.

en-us	You can reset your password every %interval% minute(s) only. Please try again later.

en-us	Please, check your mailbox. A link to reset your password has been sent to you.

en-us	An error occurred while attempting to reset your password.

en-us	Some identification information is missing.

en-us	The password is missing: please enter your new password.

en-us	The password is not in a valid format.

en-us	The confirmation is empty: please fill in the password confirmation as well.

en-us	The password and its confirmation do not match. Please double check both passwords.

en-us	Your password reset request expired. Please start again.

en-us	An error occurred while attempting to change your password.

en-us	The password has been changed successfully.